No Name R.A. Decl. ExpT Date MMJD Field Status Slit Grism Pol.Ang seeing(”) 1 03D4aa-180 +22:16:56.300 -17:57:37.912 2*750 2003-06-30 05:44 180.28 D4 PHOT 1.0 300V -104.3 0.64 2 03D4ag-180 +22:14:45.830 -17:44:22.762 2*750 2003-06-30 06:25 180.31 D4 PHOT 1.0 300V -43.0 0.56 3 03D4ai-180 +22:16:41.550 -17:26:10.702 2*750 2003-06-30 07:11 180.34 D4 PHOT 1.0 300V -14.7 0.66 4 03D4ad-183 +22:15:39.930 -17:35:14.240 2*750 2003-07-03 05:00 183.25 D4 PHOT 1.0 300V 0.0 0.81 5 03D4bc-183 +22:15:28.150 -17:49:48.562 3*750 2003-07-03 05:41 183.28 D4 PHOT 1.0 300V -67.3 0.77 6 03D4aq-186 +22:14:04.414 -17:22:29.431 3*750 2003-07-06 04:01 186.21 D4 PHOT 1.0 300V -20.8 0.72 7 03D4at-186 +22:14:24.040 -17:46:36.221 3*750 2003-07-06 05:02 186.25 D4 PHOT 1.0 300V -169.2 0.75 8 03D4au-186 +22:16:09.925 -18:04:39.299 3*750 2003-07-06 06:00 186.29 D4 PHOT 1.0 300V -55.1 0.69 9 03D4ar-186 +22:16:58.249 -17:17:05.939 3*750 2003-07-06 06:56 186.33 D4 PHOT 1.0 300V -41.3 0.77 10 03D4bl-211 +22:14:05.400 -17:18:38.329 3*750 2003-07-31 03:17 211.18 D4 PHOT 1.3 300V -78.9 0.90 11 03D4be-211 +22:14:09.090 -17:36:39.082 3*750 2003-07-31 04:30 211.23 D4 PHOT 1.3 300V -59.1 0.85 12 03D4cw-239 +22:16:11.562 -17:14:00.719 3*750 2003-08-28 00:17 239.05 D4 PHOT 1.3 300V -128.5 0.86 13 03D4bl-239 +22:14:05.400 -17:18:38.329 3*750 2003-08-28 01:19 239.10 D4 PHOT 1.0 300V -71.4 0.74 14 03D4ct-241 +22:15:35.790 -17:18:31.702 3*750 2003-08-30 03:06 241.17 D4 PHOT 1.0 300V 0.0 0.67 15 03D4dq-241 +22:13:36.040 -17:21:34.070 3*750 2003-08-30 03:58 241.21 D4 PHOT 1.0 300V 0.0 0.60 16 03D4da-245 +22:15:57.050 -18:05:22.222 3*750 2003-09-03 01:14 245.09 D4 PHOT 1.0 300V -12.8 0.62 17 03D4dx-245 +22:13:43.638 -18:06:46.231 3*750 2003-09-03 02:29 245.15 D4 PHOT 0.7 300V -149.8 0.53 18 03D4cx-245 +22:14:33.753 -17:35:15.040 3*750 2003-09-03 03:34 245.19 D4 PHOT 0.7 300V -150.7 0.53 19 03D4di-245 +22:14:10.239 -17:30:23.828 3*750 2003-09-03 04:33 245.23 D4 PHOT 0.7 300V -127.8 0.59 20 03D4cw-248 +22:16:11.562 -17:14:00.719 3*750 2003-09-06 06:04 248.29 D4 PHOT 1.0 300V -128.5 0.69 21 03D4cx-248 +22:14:33.753 -17:35:15.040 3*750 2003-09-06 07:02 248.34 D4 PHOT 1.0 300I -60.5 0.76 22 03D4di-249 +22:14:10.239 -17:30:23.828 3*750 2003-09-07 03:34 249.19 D4 PHOT 1.0 300I -127.8 0.55 23 03D4cy-269 +22:13:40.414 -17:40:53.890 3*750 2003-09-27 01:30 269.10 D4 PHOT 1.3 300V -0.2 0.88 24 NoMatch-269 +22:15:45.096 -18:12:04.140 3*750 2003-09-27 02:31 269.15 D4 PHOT 1.3 300V -85.7 1.00 25 03D1bf-269 +02:24:02.393 -04:55:57.119 3*750 2003-09-27 04:33 269.23 D1 PHOT 1.3 300V -35.1 0.96 26 03D1bo-270 +02:24:32.528 -04:31:34.691 3*750 2003-09-28 05:26 270.27 D1 PHOT 1.3 300V -97.2 0.75 27 03D1bp-270 +02:26:37.737 -04:50:19.601 3*750 2003-09-28 06:24 270.31 D1 PHOT 1.3 300V -47.3 0.82 28 03D1ar-270 +02:27:14.670 -04:19:04.750 3*750 2003-09-28 07:16 270.35 D1 PHOT 1.3 300V -157.6 0.79 29 03D4dy-272 +22:14:50.526 -17:57:23.321 3*750 2003-09-30 01:44 272.11 D4 PHOT 1.3 300V 0.0 0.77 30 03D4eb-272 +22:16:57.090 -17:17:59.572 3*750 2003-09-30 03:35 272.19 D4 PHOT 0.7 300V -88.0 0.64 31 03D1bm-272 +02:24:36.090 -04:12:44.482 3*750 2003-09-30 04:34 272.23 D1 PHOT 0.7 300V -150.4 0.54 32 03D1aq-275 +02:25:03.040 -04:05:01.979 3*750 2003-10-03 02:23 275.14 D1 PHOT 0.7 300V -98.8 0.63 33 03D1bf-275 +02:24:02.393 -04:55:57.119 3*750 2003-10-03 03:22 275.18 D1 PHOT 0.7 300V -35.4 0.60 34 03D1fn-275 +02:27:01.502 -04:09:12.409 3*750 2003-10-03 04:17 275.22 D1 PHOT 0.7 300V 0.0 0.56 35 03D1bt-306 +02:26:09.640 -04:02:24.540 3*750 2003-11-03 02:58 306.17 D1 PHOT 1.0 300V -10.0 0.70 36 03D1cq-306 +02:24:22.939 -04:11:00.809 3*750 2003-11-03 03:52 306.20 D1 PHOT 1.0 300V -28.1 0.73 37 03D1bz-306 +02:24:46.506 -04:21:00.101 3*750 2003-11-03 04:45 306.24 D1 PHOT 1.0 300V -42.1 0.85 38 03D1df-307 +02:26:41.911 -04:45:12.751 5*750 2003-11-04 03:12 307.18 D1 PHOT 1.0 300V -136.7 0.66 39 03D1co-307 +02:26:16.260 -04:56:06.180 5*750 2003-11-04 04:39 307.24 D1 PHOT 1.0 300V -4.5 0.70 40 03D4gf-329 +22:14:22.935 -17:44:02.519 5*750 2003-11-25 23:46 329.03 D4 PHOT 1.0 300V -150.5 0.71

No Name R.A. Decl. ExpT Date MMJD Field Status Slit Grism Pol.Ang seeing(”) 41 03D4gg-330 +22:16:40.190 -18:09:52.088 5*750 2003-11-27 00:07 330.05 D4 PHOT 1.0 300V -49.2 0.50 42 03D1es-332 +02:24:47.828 -04:31:00.689 5*750 2003-11-29 01:44 332.11 D1 PHOT 1.0 300V -75.8 0.58 43 03D1dt-333 +02:26:31.192 -04:03:08.438 3*750 2003-11-30 02:47 333.16 D1 PHOT 1.0 300V -157.8 0.70 44 03D1en-336 +02:25:48.699 -04:24:02.711 5*750 2003-12-03 01:44 336.11 D1 PHOT 1.3 300V -100.9 0.67 45 03D1fl-355 +02:25:58.299 -04:07:44.040 5*750 2003-12-22 01:34 355.11 D1 PHOT 1.3 300V -152.1 0.71 46 03D1ey-355 +02:26:49.413 -04:11:53.480 5*750 2003-12-22 03:01 355.17 D1 PHOT 1.3 300V -95.3 0.76 47 03D1fc-358 +02:25:43.595 -04:08:38.602 5*750 2003-12-25 01:44 358.11 D1 PHOT 1.0 300V -125.0 0.78 48 03D1fb-360 +02:27:12.797 -04:07:16.090 5*750 2003-12-27 02:04 360.13 D1 PHOT 1.3 300V -78.7 0.71 49 03D1fm-361 +02:26:10.080 -04:26:53.509 5*750 2003-12-27 23:59 361.04 D1 PHOT 1.3 300V -90.3 1.01 50 NoMatch-361 +02:28:19.843 -04:40:16.428 1*274 2003-12-28 01:24 361.10 (D1+6’) AUTO 1.3 300V -65.0 0.71 51 03D1gh-361 +02:27:43.547 -04:35:39.491 5*750 2003-12-28 01:42 361.11 D1 PHOT 1.3 300V -65.0 0.65 52 04D1aj-381 +02:25:53.962 -04:59:40.589 5*750 2004-01-17 00:21 381.06 D1 PHOT 1.3 300V -0.0 0.99 53 03D1gr-382 +02:25:58.995 -04:09:28.019 5*750 2004-01-18 00:03 382.04 D1 PHOT 1.3 300V -52.0 0.86 54 04D1ag-383 +02:24:41.098 -04:17:19.511 3*750 2004-01-19 00:05 383.05 D1 PHOT 1.3 300V -42.2 0.83 55 04D1aj-384 +02:25:53.962 -04:59:40.589 5*750 2004-01-20 00:05 384.05 D1 PHOT 1.3 300V -0.0 0.80 56 03D1gt-385 +02:24:56.010 -04:07:36.800 5*750 2004-01-21 00:05 385.05 D1 PHOT 1.3 300V -84.2 0.76 57 04D2am-385 +10:01:51.617 +02:01:42.190 5*750 2004-01-21 02:48 385.16 D2 PHOT 1.3 300V -0.3 0.92 58 04D2an-386 +10:00:52.309 +02:02:28.439 5*750 2004-01-22 02:45 386.16 D2 PHOT 1.0 300V -44.6 0.65 59 04D1ak-388 +02:27:33.354 -04:19:38.780 5*750 2004-01-24 00:01 388.04 D1 PHOT 1.0 300V -152.2 0.79 60 04D2al-390 +10:01:52.476 +02:09:50.789 6*750 2004-01-26 02:55 390.16 D2 PHOT 1.3 300V -113.3 0.83 61 04D2an-392 +10:00:52.309 +02:02:28.439 5*750 2004-01-28 04:00 392.21 D2 PHOT 1.3 300V -44.6 0.71 62 04D2bn-392 +09:59:08.082 +02:05:16.159 5*750 2004-01-28 05:29 392.27 D2 PHOT 1.0 300V -49.6 0.93 63 04D2ac-395 +10:00:18.884 +02:41:21.350 3*750 2004-01-31 05:05 395.25 D2 PHOT 1.3 300V -103.2 0.87 64 04D2bt-444 +09:59:32.693 +02:14:53.002 5*750 2004-03-20 02:25 444.14 D2 PHOT 1.0 300V 0.0 0.62 65 04D2dc-444 +10:00:16.681 +02:12:18.518 5*750 2004-03-20 03:56 444.21 D2 PHOT 1.0 300V -132.6 0.80 66 04D2cw-445 +10:01:22.778 +02:11:54.809 5*750 2004-03-21 01:06 445.09 D2 PHOT 1.3 300V -79.9 0.71 67 04D2cf-445 +10:01:56.089 +01:52:46.132 5*750 2004-03-21 02:36 445.15 D2 PHOT 1.0 300V -120.3 0.77 68 04D2ca-445 +10:01:20.486 +02:20:21.689 2*750 2004-03-21 04:13 445.22 D2 PHOT 1.3 300V -151.4 0.80 69 04D2cc-446 +09:58:44.724 +02:16:14.880 5*750 2004-03-22 03:27 446.19 D2 PHOT 1.3 300V -120.5 0.83 70 04D2cf-447 +10:01:56.089 +01:52:46.132 5*750 2004-03-23 01:35 447.11 D2 PHOT 1.3 300V -120.3 0.78 71 04D2ca-447 +10:01:20.486 +02:20:21.689 5*750 2004-03-23 03:05 447.17 D2 PHOT 1.3 300V -151.4 0.73 72 04D2cd-448 +09:58:49.447 +02:25:11.431 5*750 2004-03-24 00:26 448.06 D2 PHOT 1.3 300V -56.0 0.79 73 04D2fm-448 +10:00:21.788 +02:12:20.401 5*750 2004-03-24 01:51 448.12 D2 PHOT 1.0 300V -145.1 0.68 74 04D2cc-448 +09:58:44.724 +02:16:14.880 5*750 2004-03-24 04:44 448.24 D2 PHOT 1.0 300V -120.5 0.81 75 04D2fs-470 +10:00:22.086 +01:45:55.440 3*750 2004-04-15 00:18 470.05 D2 PHOT 1.0 300V -60.0 0.59 76 04D2fp-470 +09:59:28.119 +02:19:15.661 3*750 2004-04-15 01:19 470.10 D2 PHOT 1.0 300V -159.1 0.67 77 04D2gc-471 +10:01:39.264 +01:52:58.991 5*750 2004-04-15 23:02 471.00 D2 PHOT 1.0 300V -128.4 0.62 78 04D2gd-474 +09:59:12.905 +01:53:34.609 5*750 2004-04-18 22:44 473.99 D2 PHOT 1.3 300V -36.3 1.17 79 04D2gd-475 +09:59:12.905 +01:53:34.609 5*750 2004-04-19 22:50 474.99 D2 PHOT 1.3 300V -36.3 0.84 80 04D2gp-475 +09:59:20.372 +02:30:31.972 5*750 2004-04-20 00:24 475.06 D2 PHOT 1.0 300V -130.3 0.77

No Name R.A. Decl. ExpT Date MMJD Field Status Slit Grism Pol.Ang seeing(”) 81 04D2iu-497 +10:01:13.221 +02:24:53.910 4*750 2004-05-12 00:33 497.06 D2 PHOT 1.3 300V 0.0 0.91 82 04D2iu-498 +10:01:13.221 +02:24:53.910 4*750 2004-05-12 22:23 497.97 D2 PHOT 1.0 300V 0.0 0.78 83 04D2ja-499 +09:58:48.502 +01:46:18.250 3*750 2004-05-13 22:44 498.99 D2 PHOT 1.0 300V -121.3 0.54 84 04D2ja-500 +09:58:48.502 +01:46:18.250 1*750 2004-05-14 22:20 499.97 D2 PHOT 1.0 300V -121.3 0.72 85 04D4bk-558 +22:15:07.703 -18:03:36.968 5*750 2004-07-12 03:57 558.21 D4 PHOT 1.3 300V 0.0 1.01 86 04D4an-558 +22:15:57.101 -17:41:43.800 5*750 2004-07-12 05:45 558.28 D4 PHOT 1.3 300V -155.9 0.88 87 04D4bq-558 +22:14:49.425 -17:49:39.320 3*750 2004-07-12 07:25 558.35 D4 PHOT 1.3 300V -111.4 1.36 88 04D4bq-562 +22:14:49.425 -17:49:39.320 5*750 2004-07-16 04:15 562.22 D4 PHOT 1.3 300V -111.4 0.83 89 04D4bo-562 +22:17:01.078 -17:50:06.659 5*750 2004-07-16 05:51 562.29 D4 PHOT 1.3 300V -41.1 0.69 90 04D4bm-562 +22:13:30.116 -18:03:00.450 5*750 2004-07-16 07:20 562.35 D4 PHOT 1.3 300V -62.2 0.90 91 04D4ai-564 +22:14:11.360 -17:20:29.011 5*750 2004-07-18 05:11 564.26 D4 PHOT 1.0 300V -8.3 0.74 92 04D4dw-566 +22:16:44.674 -17:50:02.648 5*750 2004-07-20 06:43 566.32 D4 PHOT 1.0 300V -60.7 0.66 93 04D4es-588 +22:15:04.453 -17:19:35.540 5*750 2004-08-11 03:00 588.17 D4 PHOT 1.0 300V -47.8 0.71 94 04D4et-588 +22:14:51.788 -17:47:22.859 5*750 2004-08-11 04:47 588.24 D4 PHOT 1.0 300V -22.4 0.88 95 04D4dt-588 +22:13:59.849 -17:35:14.572 5*750 2004-08-11 06:29 588.31 D4 PHOT 1.0 300V -12.3 0.78 96 04D4fu-589 +22:14:11.454 -17:32:32.730 3*750 2004-08-12 01:15 589.09 D4 PHOT 1.0 300V -16.5 0.93 97 04D4fx-589 +22:16:38.135 -18:03:58.871 5*750 2004-08-12 02:30 589.15 D4 PHOT 1.0 300V -0.3 0.70 98 04D1dc-589 +02:26:18.463 -04:18:43.081 2*750 2004-08-12 06:30 589.31 D1 PHOT 1.0 300V -135.1 0.75 99 04D4gd-590 +22:15:09.449 -18:13:38.071 2*750 2004-08-13 01:32 590.11 D4 PHOT 1.3 300V -150.8 0.85 100 04D4ge-598 +22:15:46.120 -17:28:16.500 5*750 2004-08-21 03:24 598.18 D4 PHOT 1.3 300V -118.8 0.91 101 04D4hf-598 +22:16:57.902 -17:41:13.301 5*750 2004-08-21 04:49 598.24 D4 PHOT 1.3 300V 0.0 0.94 102 04D4gz-598 +22:16:59.006 -17:37:18.840 5*750 2004-08-21 06:12 598.30 D4 PHOT 1.3 300V -11.7 1.02 103 04D1ff-619 +02:25:38.620 -04:54:09.439 5*750 2004-09-11 06:32 619.31 D1 PHOT 1.3 300V 90.0 0.83 104 04D4gz-620 +22:16:59.006 -17:37:18.840 6*750 2004-09-12 00:19 620.06 D4 PHOT 1.3 300V -11.7 1.13 105 04D4id-628 +22:16:21.411 -17:13:44.670 5*750 2004-09-20 03:06 628.17 D4 PHOT 1.0 300V -32.5 0.86 106 04D4ht-628 +22:14:33.277 -17:21:31.201 5*750 2004-09-20 04:34 628.23 D4 PHOT 1.3 300V -23.6 0.86 107 04D1hx-628 +02:24:42.496 -04:47:25.170 5*750 2004-09-20 06:14 628.30 D1 PHOT 1.3 300V -7.3 0.77 108 04D4ib-629 +22:16:41.711 -18:06:18.320 5*750 2004-09-20 22:50 628.99 D4 PHOT 1.3 300V -95.4 0.91 109 04D4it-629 +22:16:00.550 -18:05:48.548 5*750 2004-09-21 00:28 629.06 D4 PHOT 1.0 300V -63.4 0.81 110 04D1hk-630 +02:24:45.972 -04:24:03.920 5*750 2004-09-22 04:12 630.22 D1 PHOT 1.0 300V -100.2 0.90 111 04D1iv-630 +02:24:48.051 -04:09:09.220 5*750 2004-09-22 05:37 630.28 D1 PHOT 1.3 300V -108.3 0.89 112 04D1jd-630 +02:27:50.837 -04:56:37.630 5*750 2004-09-22 07:04 630.34 D1 PHOT 1.3 300V -91.6 0.86 113 04D4kd-649 +22:13:44.099 -17:57:59.130 3*750 2004-10-10 23:21 649.02 D4 PHOT 1.3 300V -174.3 1.01 114 04D1ks-649 +02:24:09.516 -04:58:43.370 3*750 2004-10-11 02:49 649.16 D1 PHOT 1.0 300V -68.5 0.75 115 04D1la-649 +02:26:39.812 -04:49:53.040 3*750 2004-10-11 03:49 649.20 D1 PHOT 1.0 300V -68.9 0.70 116 04D4jv-650 +22:15:36.829 -18:09:21.211 3*750 2004-10-11 23:14 650.01 D4 PHOT 1.0 300V -114.2 0.73 117 04D4jr-650 +22:14:14.319 -17:21:00.770 3*750 2004-10-12 00:12 650.05 D4 PHOT 1.0 300V -63.8 0.64 118 04D4ju-650 +22:17:02.725 -17:19:58.120 3*750 2004-10-12 01:10 650.09 D4 PHOT 1.0 300V -20.6 0.64 119 04D1kj-650 +02:27:52.659 -04:10:48.900 3*750 2004-10-12 03:36 650.19 D1 PHOT 1.0 300V -117.9 0.54 120 04D4jw-651 +22:17:18.891 -17:39:55.771 5*932 2004-10-12 23:18 651.01 D4 PHOT 1.0 300V -38.7 0.93

No Name R.A. Decl. ExpT Date MMJD Field Status Slit Grism Pol.Ang seeing(”) 121 04D4jn-651 +22:14:27.414 -17:58:10.358 3*750 2004-10-13 00:09 651.05 D4 PHOT 1.3 300V -162.5 0.83 122 04D1me-652 +02:24:32.438 -04:25:36.660 4*900 2004-10-14 01:50 652.12 D1 PHOT 1.3 300V -27.9 0.90 123 04D4kq-659 +22:13:31.689 -17:53:47.670 4*900 2004-10-20 23:31 659.02 D4 PHOT 1.3 300V -145.2 0.74 124 04D4kr-659 +22:15:50.073 -17:52:27.210 4*900 2004-10-21 00:55 659.08 D4 PHOT 1.0 300V -132.8 0.81 125 04D1ox-680 +02:27:11.294 -04:36:33.671 3*691 2004-11-11 04:25 680.23 D1 PHOT 1.0 300V -123.7 0.88 126 04D4lj-682 +22:15:01.472 -17:49:19.891 4*900 2004-11-12 23:34 682.02 D4 PHOT 1.3 300V -28.3 0.89 127 04D1ox-682 +02:27:11.294 -04:36:33.671 4*900 2004-11-13 00:59 682.08 D1 PHOT 1.3 300V -123.7 0.76 128 04D1pd-682 +02:27:39.753 -04:37:52.219 4*900 2004-11-13 02:24 682.14 D1 PHOT 1.0 300V -121.4 0.66 129 04D1ow-683 +02:26:42.695 -04:18:22.280 4*900 2004-11-14 01:36 683.11 D1 PHOT 1.0 300V -84.6 0.65 130 04D1pp-683 +02:25:12.478 -04:42:05.692 4*900 2004-11-14 03:06 683.17 D1 PHOT 1.0 300V -162.0 0.56 131 04D1pc-684 +02:26:24.874 -04:23:57.818 4*900 2004-11-15 02:26 684.14 D1 PHOT 1.0 300V -51.7 0.54 132 04D1pg-684 +02:27:04.158 -04:10:31.019 3*750 2004-11-15 03:56 684.21 D1 PHOT 1.0 300V -100.8 0.56 133 04D1qd-688-1 +02:26:33.075 -04:06:25.841 2*496 2004-11-19 03:53 688.20 D1 PHOT 1.3 300I -75.9 0.87 134 04D1qd-688 +02:26:33.075 -04:06:25.841 4*900 2004-11-19 04:15 688.22 D1 PHOT 1.3 300V -75.9 0.87 135 04D1rh-710 +02:27:47.147 -04:15:13.568 3*750 2004-12-11 03:49 710.20 D1 PHOT 1.3 300V -162.7 0.78 136 04D1rx-713 +02:25:11.016 -04:37:06.010 4*900 2004-12-14 00:17 713.05 D1 PHOT 1.0 300V -57.4 0.75 137 04D1qt-713 +02:26:26.190 -04:59:09.668 4*900 2004-12-14 01:37 713.11 D1 PHOT 1.0 300V -13.6 0.81 138 04D1si-716 +02:24:48.796 -04:34:08.220 4*900 2004-12-16 23:55 716.04 D1 PHOT 1.3 300V -79.1 1.22 139 04D1sa-716 +02:27:56.158 -04:10:33.870 3*750 2004-12-17 01:12 716.09 D1 PHOT 1.3 300V -50.9 0.97 140 04D1so-717 +02:27:30.569 -04:18:37.379 2*672 2004-12-18 00:32 717.06 D1 PHOT 1.3 300V -26.1 1.00 141 04D2na-736 +09:58:41.904 +02:03:43.729 3*750 2005-01-06 05:22 736.27 D2 PHOT 1.3 300V -165.3 0.87 142 04D2mc-736 +10:00:35.579 +01:47:03.440 3*750 2005-01-06 06:37 736.32 D2 PHOT 1.0 300V -122.2 0.84 143 04D1tm-737 +02:24:37.375 -04:53:07.901 3*750 2005-01-07 00:43 737.07 D1 PHOT 1.3 300V -114.9 1.13 144 04D2kx-738 +10:00:07.065 +02:39:06.350 4*900 2005-01-08 05:38 738.28 D2 PHOT 1.0 300V -95.4 0.56 145 05D2ac-738 +09:58:59.233 +02:29:22.211 3*750 2005-01-08 07:06 738.34 D2 PHOT 1.0 300V -124.0 0.56 146 05D2aw-745 +09:58:43.182 +02:40:30.000 4*900 2005-01-15 06:19 745.31 D2 PHOT 1.3 300V -101.8 0.73 147 05D2ay-746 +10:01:08.320 +02:07:49.130 4*900 2005-01-16 06:00 746.29 D2 PHOT 1.0 300V -31.7 0.70 148 05D2bw-764 +09:58:30.559 +02:32:11.051 4*900 2005-02-03 02:24 764.14 D2 PHOT 1.0 300V -41.5 0.69 149 05D2bv-764 +10:02:16.999 +02:14:26.160 3*750 2005-02-03 03:51 764.20 D2 PHOT 1.0 300V -82.6 0.71 150 05D2bt-764 +10:01:40.245 +02:33:58.180 3*500 2005-02-03 04:46 764.24 D2 PHOT 1.0 300V -18.6 0.64 151 05D2by-775 +10:00:28.032 +02:31:17.551 4*900 2005-02-14 06:36 775.32 D2 PHOT 1.0 300V -8.3 0.95 152 05D2cb-775 +09:59:24.581 +02:19:41.459 2*700 2005-02-14 08:02 775.38 D2 PHOT 1.0 300V -70.9 1.02 153 05D2cp-794 +10:00:08.480 +02:28:07.342 9*900 2005-03-05 00:53 794.08 D2 PHOT 1.3 300V -142.8 0.79 154 05D2cl-795 +09:58:48.602 +02:36:00.371 9*900 2005-03-06 00:38 795.07 D2 PHOT 1.3 300V -68.8 0.90 155 05D2ci-795 +10:00:02.041 +02:12:57.060 3*502 2005-03-06 03:41 795.20 D2 PHOT 1.3 300V -104.4 1.04 156 05D2ci-796 +10:00:02.041 +02:12:57.060 3*603 2005-03-07 00:17 796.05 D2 PHOT 1.3 300V -104.4 0.51 157 05D2ct-799 +10:01:42.183 +02:07:25.669 8*900 2005-03-10 00:00 799.04 D2 PHOT 1.0 300V -114.4 0.74 158 05D2ci-799 +10:00:02.041 +02:12:57.060 2*900 2005-03-10 02:32 799.15 D2 PHOT 1.3 300V -104.4 0.73 159 05D2cm-801 +10:02:25.763 +01:56:03.890 4*900 2005-03-12 01:41 801.11 D2 PHOT 1.0 300I 170.2 0.75 160 05D2dy-805 +10:00:58.099 +02:10:59.160 4*900 2005-03-16 00:21 805.06 D2 PHOT 0.7 300V -162.6 0.76

No Name R.A. Decl. ExpT Date MMJD Field Status Slit Grism Pol.Ang seeing(”) 161 05D2eb-805 +10:00:14.564 +02:24:26.770 4*900 2005-03-16 01:45 805.12 D2 PHOT 1.3 300V -152.5 0.77 162 05D2ec-805 +09:59:26.184 +02:00:49.050 4*900 2005-03-16 03:07 805.17 D2 PHOT 1.3 300V -160.1 0.80 163 05D2dw-807 +09:58:32.069 +02:01:56.071 4*900 2005-03-18 01:53 807.12 D2 PHOT 1.3 300V -157.8 0.66 164 05D2dt-807 +10:01:23.926 +01:51:27.871 4*900 2005-03-18 03:31 807.19 D2 PHOT 1.3 300V -33.6 0.86 165 05D2dm-807 +10:02:07.636 +02:03:16.949 4*900 2005-03-18 04:55 807.25 D2 PHOT 1.3 300V -64.2 1.02 166 05D2fq-827 +09:59:08.503 +02:36:07.211 4*900 2005-04-07 00:38 827.07 D2 PHOT 1.3 300V -143.9 0.77 167 05D2ie-829 +10:01:02.907 +02:39:28.901 4*900 2005-04-09 02:05 829.13 D2 PHOT 1.3 300V -145.6 0.79 168 05D2he-833 +10:01:26.511 +02:19:03.832 4*900 2005-04-13 00:42 833.07 D2 PHOT 1.0 300V -167.8 0.83 169 05D2ii-833 +09:59:14.196 +01:52:26.749 4*900 2005-04-13 02:04 833.13 D2 PHOT 1.0 300V -165.6 0.60 170 05D2ei-833 +10:01:39.116 +01:49:11.820 3*750 2005-04-13 03:33 833.19 D2 PHOT 1.3 300V 176.4 0.71 171 05D4af-914 +22:16:33.142 -18:00:17.719 4*900 2005-07-03 07:07 914.34 D4 PHOT 0.7 300V -166.9 0.60 172 05D4ay-914 +22:14:33.190 -17:46:03.580 3*900 2005-07-03 08:33 914.40 D4 PHOT 0.7 300V -147.8 0.68 173 05D4ay-916 +22:14:33.190 -17:46:03.580 1*900 2005-07-05 09:09 916.42 D4 PHOT 1.0 300V -147.8 0.73 174 05D4be-918 +22:16:53.389 -17:14:09.931 3*750 2005-07-07 05:51 918.29 D4 PHOT 0.7 300V -62.7 0.55 175 05D4bg-918 +22:15:39.911 -17:33:47.401 4*900 2005-07-07 06:49 918.33 D4 PHOT 0.7 300V 0.0 0.54 176 05D4bi-918 +22:15:56.526 -17:59:09.578 4*900 2005-07-07 08:07 918.38 D4 PHOT 0.7 300V -118.0 0.64 177 05D4bc-919 +22:17:22.464 -18:08:45.701 3*900 2005-07-08 07:21 919.35 D4 PHOT 1.0 300V -27.0 0.65 178 05D4ar-920 +22:14:30.621 -18:02:20.569 4*900 2005-07-09 06:44 920.32 D4 PHOT 1.0 300V -38.2 0.68 179 05D4bj-921 +22:14:59.663 -18:08:00.240 4*900 2005-07-10 06:48 921.33 D4 PHOT 0.7 300V -114.2 0.68 180 05D4bn-921 +22:16:07.396 -17:30:40.360 4*900 2005-07-10 08:12 921.38 D4 PHOT 1.3 300V -31.9 0.74 181 05D4ag-922 +22:13:47.425 -18:09:54.950 4*900 2005-07-11 08:10 922.38 D4 PHOT 1.0 300V -16.1 0.57 182 05D4cs-946 +22:17:17.818 -17:52:48.529 3*750 2005-08-04 04:04 946.21 D4 PHOT 1.0 300V 0.0 0.90 183 05D4cq-946 +22:14:09.650 -18:13:36.149 3*750 2005-08-04 05:03 946.25 D4 PHOT 1.0 300V -45.5 0.58 184 05D4cw-950 +22:14:50.077 -17:44:19.550 3*750 2005-08-08 05:14 950.26 D4 PHOT 1.0 300V -94.1 0.64 185 05D4cn-952 +22:13:31.454 -17:17:19.838 4*900 2005-08-10 02:28 952.14 D4 PHOT 1.3 300V -134.4 0.73 186 05D4ca-952 +22:14:11.362 -17:48:15.649 3*750 2005-08-10 03:50 952.20 D4 PHOT 1.0 300V -52.6 0.65 187 05D1bm-957 +02:27:09.905 -04:46:21.169 3*900 2005-08-15 08:26 957.39 D1 PHOT 1.3 300V -0.1 0.78 188 NoMatch-959 +02:21:42.048 -03:21:54.004 7*750 2005-08-17 06:25 959.31 (D1+63’) AUTO 1.0 300I -30.0 1.01 189 05D4dw-983 +22:16:55.877 -18:03:05.260 6*900 2005-09-10 00:48 983.08 D4 PHOT 1.3 300V -156.3 0.84 190 05D4dp-983 +22:15:55.389 -17:29:06.130 4*900 2005-09-10 02:44 983.16 D4 PHOT 1.3 300V -113.9 0.89 191 05D1cs-983 +02:27:16.122 -04:10:59.711 6*900 2005-09-10 04:18 983.22 D1 PHOT 1.3 300V -29.5 0.59 192 05D1ck-984 +02:24:24.851 -04:42:46.091 4*900 2005-09-11 07:29 984.35 D1 PHOT 1.3 300V -108.8 1.04 193 05D4ev-985 +22:13:30.424 -17:42:02.801 6*900 2005-09-12 01:33 985.11 D4 PHOT 1.0 300V -132.3 0.63 194 NoMatch-985 +22:14:45.624 -17:32:28.644 6*900 2005-09-12 03:57 985.21 D4 PHOT 1.0 300V -83.2 0.79 195 05D1cb-985 +02:26:57.062 -04:07:03.270 4*900 2005-09-12 06:05 985.30 D1 PHOT 1.3 300V -43.5 0.88 196 05D4ef-997 +22:13:59.278 -18:12:44.150 6*900 2005-09-24 04:08 997.21 D4 PHOT 1.3 300V -154.8 1.53 197 05D4ei-998 +22:15:07.012 -18:13:10.751 6*900 2005-09-25 00:37 998.07 D4 PHOT 1.3 300V -140.6 1.36 198 05D4dn-999 +22:16:01.331 -17:57:17.521 4*900 2005-09-26 01:00 999.08 D4 PHOT 1.3 300V -163.5 0.82 199 05D4ek-999 +22:16:27.501 -17:44:10.561 4*900 2005-09-26 02:22 999.14 D4 PHOT 1.0 300V -132.5 0.77 200 05D1cn-999 +02:27:16.391 -04:09:26.039 1*900 2005-09-26 03:59 999.21 D1 PHOT 1.0 300V -83.7 0.70

No Name R.A. Decl. ExpT Date MMJD Field Status Slit Grism Pol.Ang seeing(”) 201 05D1cn-999-1 +02:27:16.391 -04:09:26.039 5*900 2005-09-26 04:27 999.23 D1 PHOT 1.3 300V -83.7 0.47 202 05D4fe-1000 +22:15:40.283 -17:31:42.571 4*900 2005-09-27 00:47 1000.07 D4 PHOT 1.0 300V -50.0 0.60 203 05D4ej-1000 +22:15:52.499 -18:11:44.362 4*900 2005-09-27 02:07 1000.13 D4 PHOT 1.0 300V -46.0 0.65 204 05D1cl-1000 +02:25:05.663 -04:13:15.010 6*900 2005-09-27 03:30 1000.19 D1 PHOT 1.0 300V -132.0 0.84 205 05D4fg-1002 +22:16:41.353 -17:35:43.721 4*900 2005-09-29 02:27 1002.14 D4 PHOT 1.0 300V -53.1 0.74 206 05D1dn-1002 +02:24:26.628 -04:59:29.299 4*900 2005-09-29 03:55 1002.21 D1 PHOT 1.3 300V -36.5 0.81 207 05D4ff-1003 +22:16:20.140 -18:02:32.820 4*900 2005-09-29 22:58 1003.00 D4 PHOT 1.0 300V -16.1 0.79 208 05D1dp-1003 +02:27:43.201 -04:52:05.290 4*900 2005-09-30 05:15 1003.26 D1 PHOT 1.3 300V -7.9 0.77